297 mm

- - - Fold - - -

Back Cover

Front Cover

Text no further than here

210 mm

A5 4 page Template
297mm x 210mm

Please delete these guides before sending to print

Finished item will be cut here

3mm Bleed

Inside Left

Inside Right